ClientInsFile 1.0

Server
    EditorName        = 'SignalIntegrity'                                                         
    EditorExePath     = 'SignalIntegrity.DLL'                                                     
    EditorDescription = 'Signal Integrity'                                                        
    Version           = 'Version 1.0.0.29688'                                                         
    Date              = '02-Sep-2013'                                                             
    HelpAboutInfo     = 'This software is protected by copyright law and international treaties.' 
    Copyright         = 'Copyright © Altium Limited 2013'
    Updates           = 'AdvSch'
    Updates           = 'AdvPcb'
End


EditorWindowKind
    Name              = 'PCB'
    EditorBar Name    = 'TLSignalIntegrity' BarType = Toolbar  End
End

EditorWindowKind
    Name              = 'SCH'
    EditorBar Name    = 'TLSignalIntegrity' BarType = Toolbar  End
End

EditorWindowKind
    Name                  = 'SiModel'
    NewWindowCaption      = 'SiModel'
    NewWindowExtention    = 'SiModel'
    WindowKindDescription = 'Signal Integrity Model Implementation Document'
    IconName              = 'SiModel'

    EditorBar Name = 'MNSiModelEditorMenu'            BarType = Menu        End
    EditorBar Name = 'TBSiModelEditor_Tools'          BarType = Toolbar     End
    EditorBar Name = 'TBNavigation'                   BarType = Toolbar     End
    EditorBar Name = 'TBLayout'                       BarType = Toolbar     End

    LoadFilters
        'Signal Integrity Model Implementation Document (*.SiModel)'
    End

    SaveFilters
        'Signal Integrity Model Implementation Document (*.SiModel)'
    End
End

PanelInfo
    Name              = 'AutoCheck'
    Category          = '&Editor'
    Bitmap            = ''
    Hotkey            = 'I'
    ButtonVisible     = True
    CanDockVertical   = False
    CanDockHorizontal = False
End

Command Name = 'AbortSimulation'            LongSummary = 'Abort the current simulation'                                  End
Command Name = 'RunSimulator'               LongSummary = 'Run an SI simulation'                                          End
Command Name = 'RunStandardTests'           LongSummary = 'Run standard SI tests'                                         End
Command Name = 'UpdateSchFromOldSIModels'   LongSummary = 'Create new SI implementations based on 99SE model definitions' End
Command Name = 'LinkDocumentToReleaseVault' LongSummary = 'Link Document To Release Vault'                                End
Command Name = 'ReleaseDocument'            LongSummary = 'Release Document To Vault'                                     End

