ClientInsFile 1.0

Server
    EditorName        = 'MechatronicAD'
    EditorExePath     = 'Altium.Designer.Mechatronic.CoDesignerPanel.AD.dll'
    EditorDescription = 'CoDesigner Panel Collaboration Module'
    Version           = 'Version 1.0.0.1'
    Date              = '11/5/2018'
    HelpAboutInfo     = 'This software is protected by copyright law and international treaties.'
    Copyright         = 'Copyright © Altium Limited 2018'
    Updates           = 'ADVPCB'
    Updates           = 'ADVSCH'
    Updates           = 'TEXTEDIT'
    UpdatesUI         = 'ADVPCB'
    UpdatesUI         = 'MultiBoardAssembly'
    SystemExtension   = False
End

PanelInfo
    Name              = 'MCAD CoDesigner'
    Category          = '&PCB'
    Bitmap            = ''
    Hotkey            = ''
    ButtonVisible     = True
    CanDockVertical   = True
    CanDockHorizontal = True

	DocumentKinds
	    'PCB'
	    'MultiBoardAssembly'
    End
End

EditorWindowKind
    Name              = 'PCB'
    EditorBar Name    = 'Mechatronic'   BarType = Toolbar End
End

Command Name = 'ShowMechatronicCollaborationWindow' LongSummary = 'CoDesigner Panel Collaboration' End

